\ DEFAULT       Open file specified from command line.  by Tom Zimmer

DOS-LINE        The address of where the DOS command line resides.

DOS>TIB         ( --- )
        Move the DOS command line to the Terminal Input Buffer.

HDEFAULT        ( -- )
        Open a file specified on the comand line at startup.


